ZEUS 1994 preliminary

Q^2 = 8 GeV^2 Q^2 = 14 GeV^2 Q^2 = 27 GeV^2 Q^2 = 60 GeV^2

M_X Λ 3 GeV 3 Λ M_X Λ 7.5 GeV 7.5 Λ M_X Λ 15 GeV