x_{IP} F_2^{D(3)}

ZEUS 1994 Preliminary

ZEUS LPS 1994 Preliminary

β=0.70

Q^2 = 8 GeV^2

LPS Q^2 = 8 GeV^2 β=0.25 LPS β=0.175 β=0.07 LPS β=0.07 LPS β=0.028

Q^2 = 14 GeV^2

LPS Q^2 = 8 GeV^2 β=0.80 β=0.35 LPS β=0.375 β=0.10

Q^2 = 27 GeV^2 β=0.87 β=0.50 β=0.19

Q^2 = 60 GeV^2 β=0.94 β=0.68 β=0.34

x_{IP}